---
sidebar_position: 6
---

# Loggers
McWebserver has two different loggers: Default and Verbose.

## Default Logger

This loggers is always enabled and logs the most important stuff such as:

- Mod initialized
- Webserver enabled/disabled
- API enabled/disabled
- Webserver starting/stopping
- Webserver started/stopped
- Internal server errors while handling requests (this means only error code `500`)

## Verbose Logger

This logger is disabled by default. It logs:

- Every request made to the webserver

